-- Migration: Add bios_vendor column to hardware_snapshots
-- Date: 2025-12-14
-- Description: Add missing bios_vendor field to store BIOS manufacturer information

-- Add bios_vendor column (nullable)
ALTER TABLE hardware_snapshots ADD COLUMN bios_vendor VARCHAR(100);

-- Note: No need to populate existing rows since the field was not collected before
-- Future benchmarks will populate this field automatically
